INT OBSERVING LOG (ISAAC NEWTON GROUP, LA PALMA)

TELESCOPE:            INT
DATE:                 20020303
TAPE NR:
OBSERVER:             J Davies and S Roberts
PROGRAMME:            Virgo cluster
PATT/CAT REF.:        WFS2
TELESCOPE OPERATOR:   J. Gonzalez
SUPPORT ASTRONOMER:   R. Greimel

TELESCOPE FOCUS:      not specified
CALIBRATE RESULTS:    not specified

INSTRUMENT:           WFC

WFC FILTER WHEEL:     U, B, KPB, Z, R, I

WEATHER:              (1st half) bad
                      (2nd half) bad
CLOUD COVER (%):      (1st half) 100
                      (2nd half) 100
DUST (0-2):           (1st half) 0
                      (2nd half) 0
SEEING (arcsec):      (1st half)
                      (2nd half)

DOME OPENED (UT):     --:--

METEOROLOGICAL PARAMETERS
LT      AirT  Hum%  Wspd  Gust  Wdir  Press LocT  IntT  Mirr  LocRH IntRH
20:00   -4.9  99    0.0   0.0   251   759.5 -4.6  3.7   6.2   99    56
21:00   -4.9  99    0.0   0.0   251   759.9 -4.6  3.9   6.2   99    57
22:00   -4.1  99    0.0   0.0   251   759.9 -3.9  3.3   6.0   100   58
23:00   -4.3  99    0.0   0.0   251   759.9 -4.0  3.8   6.1   100   58
00:00   -4.7  99    0.0   0.0   251   760.1 -4.3  4.6   6.0   99    55
01:00   -5.1  99    0.0   0.0   251   760.1 -4.8  4.7   6.1   99    54
02:00   -4.9  99    0.0   0.0   251   760.1 -4.7  4.1   6.2   99    55
03:00   -5.6  99    0.0   0.0   251   759.5 -5.3  3.7   6.0   99    56
04:00   -4.5  99    0.0   0.0   251   759.5 -4.2  4.4   5.8   99    54
05:00   -5.3  99    0.0   0.0   251   759.3 -5.0  4.2   5.7   99    54
06:00   -4.8  99    0.0   0.0   251   759.7 -4.4  4.3   5.7   99    55
07:00   -4.3  99    0.0   0.0   251   760.2 -3.9  5.2   5.7   100   53

SUNSET(UT)            19:19
EVENING TWILIGHT(UT)  20:31
MORNING TWILIGHT(UT)  06:16
SUNRISE(UT)           07:27
MOON’S QUARTER (1-4)  3
DISK % OF ILLUM.      72
DARK TIME             09:45
TWILIGHT TIME         02:23
MOONRISE(UT)          23:51
MOONSET(UT)           No moonset within sunset-sunrise

TIME LOST(WEATHER):   09:45
TIME LOST(TECHNICAL): 00:00
TIME LOST(OTHER):     00:00

COMMENTS:
  Did not open dome due to bad weather.

Jun 19, 02 11:00 Page 1/2

20020303.int

Printed by Simon Hodgkin

Wednesday June 19, 2002 1/2

20020303.int

Run no. Object name              RA         Dec.     Equinox    AM    PA     UT       Exp. T.   Filter      Psys Channel  Binning Comments
 295730 test bias             1:11:59.99 +46:59:59.9 J2000.00 1.061 180.1 15:03:14.1      0.0        B     Harris           1 x 1
 295731 test flat             0:00:00.00 +00:00:00.0 J2000.00 4.337 180.1 15:16:33.7      8.1        B     Harris           1 x 1
 295732 Bias frame            0:00:00.00 +00:00:00.0 J2000.00 1.000 180.1 19:41:33.6      0.0        B     Harris           1 x 1

Jun 19, 02 11:00 Page 2/2

20020303.int

Printed by Simon Hodgkin

Wednesday June 19, 2002 2/2

20020303.int